\documentclass{article}

\usepackage[a4paper]{geometry}

\title{ Staircase at Woodbridge House }

\author{ Sam Wilson }

\date{ 2019 April 28 (Sunday), 12:24PM }

\begin{document}
\maketitle
\tableofcontents

The staircase here goes up to the tower from the first floor, but after the first landing there's a low beam obstructing passage. It appears not to have been added later, but perhaps the whole thing needed reinforcing and there's a steel beam in there. Unfortunately, the National Trust didn't have any information displayed about why it was like this.

\end{document}
