\documentclass{article}

\usepackage[a4paper]{geometry}

\title{ InstantCommons images weren&#039;t loading }

\author{ Sam Wilson }

\date{ 2023 January 18 (Wednesday), 4:20AM }

\begin{document}
\maketitle
\tableofcontents

I added a newly-scanned photo\footnote{\url{https://archives.org.au/Margaret\_by\_Susan\_Watkins\_7\_Jan\_1944}} to ArchivesWiki yesterday, and none of its images were loading (via InstantCommons). I think I was probably a bit tired, because I immediately assumed that I'm a crap sysadmin who has no business trying to run a wiki.

Coming back to it this morning, it turns out that it was some transient issue with retrieving info from Commons, and it's now resolved and everything's working normally again. Like it has for a decade or so. I'll guess I'll put off Giving Up till tomorrow.

\end{document}
