\documentclass{article}

\usepackage[a4paper]{geometry}

\title{ P26138 }

\author{ Sam Wilson }

\date{ 2022 June 27 (Monday), 1:02PM }

\begin{document}
\maketitle
\tableofcontents

It looks like they had to demolish the end wall of the power station for some reason:

\includegraphics{https://upload.wikimedia.org/wikipedia/commons/thumb/1/1d/Fremantle_Tramways_power_station_slwa_b2524061_16.png/440px-Fremantle_Tramways_power_station_slwa_b2524061_16.png?20220627061902}\footnote{\url{https://commons.wikimedia.org/wiki/File:Fremantle\_Tramways\_power\_station\_slwa\_b2524061\_16.png}}

I guess to get equipment in or something? But it seems like rather a large oversight when it's a brand new building!

\end{document}
