\documentclass{article}

\usepackage[a4paper]{geometry}

\title{ Looking towards the site of the Geffrard wreck }

\author{ Sam Wilson }

\date{ 2014 November 30 (Sunday), 3:27AM }

\begin{document}
\maketitle
\tableofcontents

Looking towards the site of the Geffrard wreck

\end{document}
